Table 3.19 from (1987TI07):

Measurements of cross sections of^3He(π^−, n)^2H

E_π (MeV) θ_n (deg) Refs.

0^a 1982GO04 0^b 1986BA06 50 − 295 20 − 150 1981KA26 100 − 290 20 − 150 1978KA01 120 40, 117 1986WE02 285 − 575 18 − 134 1982OR06 285 − 575 20 − 120 1981OR01

a Reactions π^{−3}He → nnp and π^{− 3}He→ nd measured with stopped pions. b Measured ratio^3He(π^−, π^0)/^3He(π^−, n) for pions at rest.