Table 3.18 from (1987TI07):

Measurements of cross sections of^3He(π^±, p)

E_π (MeV) θ_p (deg) Refs. 50 − 250, 295 20, 40 1983KA14 50 − 295^a 1980KA37 65^b 20 − 120^b 1984MO03 120 117, 140 1986WE02 165^c 55 1981AS10 400, 475 30 1981KA43

a 3He(π^+, p) only.

b 3He(π^+, 2p)p and^3He(π^−, pn)n reactions studied; θ_p = cm angle. c Measured relative cross sections for the^3He(π^+, 2p)p,^3He(π^−, pn)n reactions.