Table 3.17 from (1987TI07):

Measurements of cross sections of^3He(π^−, π^0)^3H

E_π− (MeV) θ_π0 (deg) Refs.

0^a 1986BA06 200^b 0 − 90 1982CO01 200 0 − 84 1980BO03 200 − 290 80 − 150 1979KA02 285 − 525 60 − 140 1982OR06 285 − 525 70 − 140 1982KA02

a Measured ratio^3He(π^−, π^0)/^3He(π^−, n) for pions at rest. b Also measured continuum angular distributions.