Table 3.16 from (1987TI07):

Measurements of cross sections of^3He(π^±, π^±)^3He

E_π (MeV) θ_π (MeV) Refs. 30 − 65 40 − 145 1984FO18 50 − 200 20 − 120 1981KA17 68^a 25 − 165 1978FA06 68 − 156^b 25 − 165 1976SH2B 98 − 208^a 25 − 165 1976SH2B 143 1984NEZY 180 44 − 96 1984NE01 145 − 195^a 1980FA12 260 − 310^b 1980KA17 295^a 1980KA17 350, 400, 475^c 60, 90, 120 1985BO41

a 3He(π^−, π^−)^3He only. b 3He(π^+, π^+)^3He only. c Measured inelastic scattering.