Table 3.15 from (1987TI07): Measurements of cross section of^3He(e, e^′p)^2H

E_e (MeV) θ_e (deg) θ_p (deg) Refs. 806, 643 31, 28 47.5 − 72.5, 54 − 72 1983GO01 527.9, 509.3 52.2, 36 53 − 77, 55 − 92 1982JA06 806, 643^a 31, 28 47.5 − 72.5, 54 − 78 1982GO06 806, 643 31, 28 47.5 − 72.5, 54 − 78 1981KO25 806, 643^b 1980GO09 1200 30 45.5 − 72.5 1978GO17

a Also measured ep coincidences for^3He(e, e^′p)np.

b A preliminary publication detailed version appears in (1982GO06).