Table 3.14 from (1987TI07):

Measurements of cross section of^3He(e, e^′)^3He

E_e (MeV) θ_e (deg) Refs. 100 − 300 65 − 180 1984KO05 120 − 667^a 36, 60, 90, 145 1985MA12 16.4 − 16.5 GeV 8 1982RO16 0.1 − 4 GeV^a 1980MC01 40 − 61 180 1979JO02 2.8 − 14.7 MeV 8 1979DA14 1211 15 − 29 1978KU11 500 60 1976MC01 60 − 110, 120 92.6, 127.7 1975KA04, 1975KA28

a Longitudinal and transverse response functions determined experimentally.