Table 3.8 from (1987TI07): Measurements of cross section of^3H(e, e)^3H

q^2 (fm^{−2}) E_e (MeV) θ_e (deg) θ3_H (deg) Refs. 0.0477 − 2.96 29.85 − 350 60 − 160 1984BE46 0.29 − 1.00 77 − 147 45 (lab) 1982BE10 0.3 − 31.3 190 − 685 25 − 104, 155 1985JU01 unspecified 200 − 600 unspecified 1984MEZZ 0.09 − 8.4 54, 134.5 1987BE30