Table 3.7 from (1987TI07): Integrated cross sections and moments from^a (1981FA03)

Reaction E_γ max σ_{int}^a σ_{−1}^b σ_{−2}^b (MeV) (MeV · mb) (mb) (mb/MeV) 3He(γ, n) 30.0 16.4 ± 2.0 0.917 ± 0.092 0.056 ± 0.004 3H(γ, n) 30.0 15.4 ± 1.8 0.986 ± 0.099 0.072 ± 0.006 3H(γ, p) 30.0 13.6 ± 1.6 0.767 ± 0.077 0.047 ± 0.004

a Obtained (1981FA03) by integrating measurements and extrapolating up to 30 MeV. b σ_{int} =

∫_{Eγ max} 0 σ(E_γ )dE_γ , σ_{−1} =

∫_{Eγ max} 0 σ(E_γ )E^{−1}_γ dE_γ , σ_{−2} =

∫_{Eγ max} 0 σ(E_γ )E^{−2}_γ dE_γ .