Table 3.2 from (1987TI07):^2H(n, γ)^3H differential cross section and analyzing power measurements by (1986MI17)

E_n (MeV) E_x (MeV) θ_{lab} (deg) Measurement 6.85 10.8 87.7 σ(θ) 9.0 12.3 53 − 135 σ(θ), A(θ) 10.8 13.5 53 − 135 σ(θ) 14.0 15.6 65, 125 σ(θ)