Table 11.29 from (2012KE01):^{11}Be β-decay scheme (1982MI08)^a

11B (keV) J^{π b} Branching^c log ft^{d 11}Be* decay I_γ^c Transition to ratio (%) E_γ (keV) (%)^{11}B* (MeV) g.s.^3_2^− 54.7 ± 2.0^e 6.826 ± 0.016 2124.693 ± 0.027^{f 1}_2^− 31.4 ± 1.8 6.644 ± 0.025 2124.473 ± 0.027 100 g.s. 4444.89 ± 0.50^5_2^− 0.054 ± 0.004 8.83 ± 0.04^g 4443.90 ± 0.50 100 g.s. 5020.31 ± 0.30^3_2^− 0.282 ± 0.020 7.93 ± 0.03 5018.98 ± 0.40 85.6 ± 0.6 g.s. 2895.30 ± 0.40 14.4 ± 0.6 2.12 6791.80 ± 0.30^{h 1}_2^+ 6.47 ± 0.45 5.93 ± 0.03 6789.81 ± 0.50 67.5 ± 1.1 g.s. 4665.90 ± 0.40 28.5 ± 1.1 2.12 1771.31 ± 0.30 4.0 ± 0.3 5.02 7285.51 ± 0.43^5_2^+ < 0.03 > 8.0 7282.92 87.0 ± 2.0 g.s. 7977.84 ± 0.42^{i 3}_2^+ 4.00 ± 0.30 5.57 ± 0.04 7974.73 46.2 ± 1.1 g.s. 5851.47 ± 0.42 53.2 ± 1.2 2.12 692.31 ± 0.10 0.85 ± 0.04 7.29 9876^3_2^+ 3.1 ± 0.4^j 4.23 ± 0.06 a See also Tables 11.15 in (1980AJ01) and 11.13 in (1985AJ01). b From Table 11.18.

c Adopted by (1982MI08); based on their work and on the earlier work. d Using T_{1/2} = 13.76 ± 0.07 sec.

e From the relative intensities of the γ-rays and I_{2.12}/I_{total β} = 0.355 ± 0.018. f See also (1980WA25, 1981AL03). g Log f_1t ≈ 10.93.

h Branching ratio to^{11}B*(4.44) is < 0.04%.

i Branching ratios to^{11}B*(4.44, 5.02, 6.79) are < 0.06, < 0.09 and < 0.10%. j From the relative intensities of the γ-rays and I_α/I_{2.12} of (1981AL03).