Table 11.9 from (2012KE01):^{10}Be and^{11}Be γ-ray transition intensities (per 100 decays) observed following^{11}Li β-decay: measurements prior to DBLA analysis

E_γ (keV)^{10}Be(E_i → E_f ) I^a I^b I^c I^d I^e 219.2 6180.3 → 5961.1 0.78 ± 0.06 0.55 ± 0.10 0.5 0.95 ± 0.35 320.0^{11}Be*(0.320 → 0) 7.8 ± 0.8 6.3 ± 0.6 7.6 ± 0.8 9.2 ± 0.7 5.2 ± 1.4 2590.3 5958.4 → 3368.0 6 ± 1 8.0 ± 1.2 8.5 3.5 ± 1.0 2592.7 5961.1 → 3368.0 2811.8 6180.3 → 3368.0 2.8 ± 0.3 0.8 ± 0.2 1.0 1.6 ± 0.7 2896.0 6264.5 → 3368.0 3367.1 3368.0 → 0 33 ± 3 29 ± 3 33.3 35 ± 3 21 ± 6 5956.5 5958.4 → 0 5959.2 5961.1 → 0 a (1997MO35).^d (1981BJ01). b (1997BO01).^e (1980DE39). c (1997AO01, 1997AO04).