Table 11.9 from (1980AJ01):

Energy levels of^{11}B from^9Be(^3He, p)^{11}B

(1959HI69)^a (1966BR18) (1960HI08) E_x (MeV ± keV) L 0 0 0 2.130 ± 10 2.1243 ± 0.9 0 4.445^b 4.4434 ± 1.8 0 5.023 ± 10 5.0187 ± 2.3 0 6.739 ± 10 6.7411 ± 3.0 6.791 ± 10 6.7909 ± 3.1 1 7.285 ± 10 7.975 ± 10 8.553 ± 10 0 8.909 ± 10 0 9.175 ± 10 9.264 ± 10 9.86 ± 20^c

a The original results were normalized to the second excited state taken to be at 4.459 MeV. Here they are shown normalized to 4.445 MeV. b (1966BR18). c Γ ≈ 150 keV.