Table 10.23 from (2004TI06):^{10}B levels from^6Li(α, α)^6Li^a

E_α (MeV ± keV) E_x (MeV) Γ_{cm} (keV) J^π; T 1.210 ± 30 5.19 105 1^+; 0 2.440^b 5.920 5.82 ± 0.06 2^+; 0 2.6060 ± 1.5 6.024 0.054 ± 0.024 4^+; 0 2.7855 ± 1.5^c 6.132 1.52 ± 0.08 3^−; 0 3.4985 ± 1.6 6.560 25.1 ± 1.1 (4^−, 2)^−; 0 4.250 ± 15 7.011 110 ± 15 (2)^+; 0

a For references see Table 10.8 in (1979AJ01) and Table 10.8 in (1974AJ01). b (1981HE05).

c (1981HE05): Γ_α = 1.47 ± 0.07 keV, Γ_d = 0.048 ± 0.030.