Table 10.15 from (2004TI06):^{10}Be levels observed following^{11}Li β-delayed neutron decay in a triple coincidence (β-n-γ) measurement (1997AO01, 1997AO04)

Decay to^{11}Be* J^π Branching log ft^{11}Be* n-decay to^{10}Be* Branching (MeV) ratio (%)^a E_x (MeV) J^π ratio (%)^a 0.32^1_2^− 7.6 ± 0.8 5.67 ± 0.04 2.69^3_2^− 26 ± 5 4.87 ± 0.08 0 0^+ 26 3.96^3_2^{− b} 21 ± 4 4.81 ± 0.08 0 0^+ 11 3.368 2^+ 10 5.24^5_2^− 8.1 ± 1.6 5.05 ± 0.08 3.368 2^+ 8.1 8.03 ± 0.05 (^1_2 ,^3_2 )^− 13 ± 3 4.43 ± 0.08 0 0^+ 0.8 3.368 2^+ 2.8 5.958 2^+ 8.0 6.179 0^+ 1.5

a Branching ratios relative to 100^{11}Li decays. b One co-author (D.J.M.) suggests J^π =^5_2^−.