Table 10.10 from (2004TI06): Levels of^{10}Be from^7Li(^7Li, p +^9Li), (^7Li, t +^7Li) and (^7Li, α +^6He) at E(^7Li) = 34 and 51 MeV^a

E_x (MeV) Γ_{cm} (keV) Decay E_x (MeV) Γ_{cm} (keV) Decay 7.542^b α 21.8 ± 0.1 ≈ 200^f p, (d) 9.56 ± 0.02^c 141 ± 10 α 22.4 ± 0.1 ≈ 250^f p, t, (t_1) 10.15 ± 0.02^d 296 ± 15 α 23.0 ± 0.1 p

10.57 α 23.35 ± 0.05 p, d, (t), α_1 11.23 ± 0.05 200 ± 80^f α 23.65 ± 0.05 p_1, (t), α, α_1 11.76 α 24.0 ± 0.1 ≈ 150^f d, (t), α_1 (11.93 ± 0.1) 200 ± 80^f α 24.25 ± 0.05 ≈ 200^f (p), d, (d_1), t, α, α_1 13.05 ± 0.1 290 ± 130^f α 24.6 ± 0.1 ≈ 150^f p_1, d 13.85 ± 0.1 330 ± 150^f α 24.8 ± 0.1 ≈ 100^f p, d, d_1 14.68 ± 0.1 310 ± 140^f α 25.05 ± 0.1 ≈ 150^f d, d_1, α_1 17.79 ≈ 130 t, α 25.6 ± 0.1 (p), d_1, α_1 18.15 ± 0.05^e ≈ 90 ± 30 t_1 25.95 ± 0.05 ≈ 300^f d, d_1 18.55 ≈ 310 t_1 26.3 ± 0.1 ≈ 100^f d, d_1, (t_1), (t_2) (19.8) p 26.8 ± 0.1 p, d, d_1, d_2, α_1 20.8 ± 0.1 α 27.2 ± 0.2 p, d, d_1, d_2, t, t_1, α, α_1

a (2001CU06, 2002LI15, 2003FL02). b Γ_α = 22 ± 8 eV (2002LI15).

c J^π = 2^+, Γ_α = 23 ± 6 keV (2002LI15). d J^π = 3^− (2001CU06). e J^π = (0^−) (2002LI15).

f Not corrected for experimental system resolution and therefore upper limits (2003FL02).