Table 7.6 from (2002TI10):^7Be(ϵ)^7Li decay^a

Branching ratio to^7Li*(0.48)^7Be Half-life Branching ratio (%) References Half-life (days) References 10^{+20}_{−7} (1938RU01) 53 ± 2 (1940HI01) 10.7 ± 2.0 (1949WI13) 52.93 ± 0.22 (1949SE20) 11.8 ± 1.2 (1949TU06) 53.61 ± 0.17 (1953KR16) 12.3 ± 0.6 (1951DI12) 53.0 ± 0.4 (1956BO36) 10.35 ± 0.08 (1969TAZX) 53.5 ± 0.2 (1957WR37) 10.47 ± 0.20 (1970MUZU) 53.1 ± 0.3 (1965EN01) 10.42 ± 0.18 (1973PO10) 53.52 ± 0.10 (1970JO21) 10.35 ± 0.08 (1974GO26) 53.0 ± 0.3 (1974CR05) 10.10 ± 0.45 (1983BA15) 53.17 ± 0.02 (1975LA16) 10.61 ± 0.23 (1983DA14) 53.16 ± 0.01 (1982CHZF) 10.6 ± 0.5 (1983DO07) 53.284 ± 0.004 (1982RUZV) 10.9 ± 1.1 (1983KN10) 53.12 ± 0.07 (1996JA10) 10.7 ± 0.2 (1983MA34) 9.8 ± 0.5 (1983NO03) 11.4 ± 0.7 (1984EV01) 10.61 ± 0.17 (1984FI10) 10.49 ± 0.07 (1984SK01) 10.44 ± 0.04 weighted average 53.22 ± 0.06^b adopted

a Evaluated by R. Helmer in conjunction with the Decay Evaluation Project (1999BEZQ, 1999BEZS). We are grateful to Dr. Helmer for providing this information to us. b Adopted by the evaluator from Limitation of Relative Statistical Weight (LRSW) (1985ZIZY, 1992RA09) analysis.