Table 7.5 from (2002TI10): Levels of^7Li from^7Li(e, e^′)^a

E_x (MeV) J^π; T Γ_{γ0} (eV) Type 0.48^1_2^−;^1_2 (2.8 ± 1.6) × 10^{−7} C2 (6.30 ± 0.31) × 10^{−3} M1 4.63 ± 0.05^{b 7}_2^−;^1_2 C2^c 6.6 ± 0.1^{d 5}_2^−;^1_2 C2 7.5 ± 0.08^5_2^−;^1_2 0.6 ± 0.3 C2 0.9 ± 0.4^e

a For a summary of B(E2↑) measurements, see Table 7.6 in (1966LA04) and the General Tables for^7Li located on our website at (www.tunl.duke.edu/NuclData/General Tables/7he.shtml). For references see (1979AJ01, 1984AJ01). b B(E2↑) [^3_2^− →^7_2^−] = 17.5 e^2 · fm^4. c Purely longitudinal. d Γ_{cm} = 875^{+200}_{−100} keV.

e From^7Li(γ, n). See also fit by (1980BA34).